This is the file which will be sent in reply to a REQFIL request which has
failed because an incorrect path or file name has been specified.

This file should provide help to the user to enable him to understand
why his request may have failed.  It can also suggest sending a REQDIR
message to confirm the path and/or file name.

If this file is not present, a default response contained within the
program REQFIL.EXE will be sent.

VERY IMPORTANT
==============
Ensure that this file does not contain any embedded WP control codes or
end with a CONTROL Z.


